-- 041: Add login lockout fields to users table
ALTER TABLE users
  ADD COLUMN IF NOT EXISTS login_fail_count INT NOT NULL DEFAULT 0,
  ADD COLUMN IF NOT EXISTS locked_until TIMESTAMPTZ;
